The Bird School

How to Solve Problem Behavior with Clicker Training:

Screaming & Screeching

for Parrots and Other Birds

Ann M. Castro

AdlA

The Bird School for Parrots and Other Birds. How to Solve Problem Behavior with Clicker Training:  Screaming & Screeching 

by Ann M. Castro

AdlA Papageienhilfe gGmbH

Neckarstrasse 23

D-65795 Hattersheim

Germany

www.thebirdschool.com

To report errors, please send a note to info@thebirdschool.com

All rights reserved

Copyright © 2012, Ann Castro 

ISBN-13 for epub edition:  978-3-939770-68-8

ISBN-13 for print edition:  978-3-939770-66-4

Layout: Ann M. Castro

Photo work: Ann M. Castro

Front cover photo:Len Charnoff

Editing: Kimberly Collins, www.newimagedocuments.org 

Notice of Rights 

All rights reserved. No part of this book may be reproduced or transmitted in any form by any means, electronic, mechanical, photocopying, recording or otherwise, without the prior written permission of the publisher. For information on getting permission for reprints and excerpts, contact ann@annsworld.de

Notice of Liability 

All effort has been made to ensure that all information in this text is accurate, up-to-date and easily understandable. As knowledge is expanded continuously, readers must verify for themselves whether any statement may have been made obsolete by newer findings. The author, publisher and any persons representing or working for the aforementioned cannot be held responsible for unforeseen consequences of the use or misuse of this information.

This book is dedicated to all the parrots and humans whose relationships no longer function. I hope I can help you with this book to find the way to each other, again.

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!