Contents

Cover

Content

Title Page

Copyright

PREFACE

ACKNOWLEDGMENTS

PART I: Professional Foundations

Chapter 1: THE OFFICE

THE PHYSICAL OFFICE

OFFICE PRACTICE AND HOW IT MAY BE STRUCTURED

RESOURCE LIBRARY

PROFESSIONAL ORGANIZATIONS

ARCHITECT/CLIENT RELATIONSHIP

IMPLEMENTATION OF THE CONSTRUCTION DOCUMENTS

BUILDING

INFLUENCE OF BUILDING INFORMATION MODELING ON BUILDING DESIGN

Chapter 2: STANDARDS AND TECHNIQUES, METRIFICATION, HAND DRAFTING, AND COMPUTER-AIDED DRAFTING

INTRODUCTION TO STANDARDS AND TECHNIQUES

DRAWING PRACTICE

LETTERING

ARCHITECTURAL DRAFTING

REPRODUCTION METHODS

OFFICE STANDARDS

METRICS

HAND DRAWING

KINDS OF DRAFTING EQUIPMENT

SELECTING AND USING DRAFTING PENCILS

COMPUTER DRAFTING

OFFICE STANDARDS

A GAME WITHIN A GAME

POWER OF THE CAD DRAFTER

DISADVANTAGES OF A COMPUTER

ADVANTAGES OF A COMPUTER

FUTURE OF CAD

CONCLUSION

Chapter 3: BIM, REVIT, AND HUMAN CONCERNS

INTRODUCTION

HUMAN CONSIDERATIONS

AMERICANS WITH DISABILITIES ACT (ADA)

BUILDING INFORMATION MODELING (BIM)

Chapter 4: SUSTAINABLE/GREEN ARCHITECTURE

ENVIRONMENTAL AND HUMAN CONSIDERATIONS

SUSTAINABLE ARCHITECTURE

LATERAL INFLUENCES

ENERGY CONSERVATION

SOUND

SNOW

FIRE AND SMOKE

TEMPERATURE

DETERIORATION

DRAINAGE/RAINFALL

UNDERGROUND GAS CONTROL

WATER TABLE

FROST LINE/FROST DEPTH

TERMITES AND TERMITE TREATMENT

ENERGY SOURCES

FUTURE OF ENERGY SOURCES

Chapter 5: CONSTRUCTION MATERIALS AND METHODS

BUILDING MATERIALS

WOOD FLOOR SYSTEMS

WOOD WALL SYSTEMS

WOOD ROOF SYSTEMS

CONCRETE

STEEL FLOOR SYSTEM

STEEL STUD WALL FRAMING SYSTEM

STEEL DECKING ROOF SYSTEM

LIGHT STEEL ROOF FRAMING SYSTEM

MASONRY WALL SYSTEM

COMPOSITE SYSTEMS AND COMBINATIONS OF MATERIALS

MATERIAL SELECTIONS

WOOD AS A MATERIAL

CONCRETE AS A MATERIAL

STEEL AS A MATERIAL

MASONRY AS A MATERIAL

Chapter 6: INITIAL PREPARATION PHASE FOR CONSTRUCTION DOCUMENTS

WORKING GUIDELINES FOR PREPARING CONSTRUCTION DOCUMENTS

MAKING THE TRANSITION FROM SCHEMATIC DRAWINGS TO CONSTRUCTION DOCUMENTS

BUILDING CODE REQUIREMENTS

PRIMARY MATERIALS ANALYSIS

SELECTING THE PRIMARY STRUCTURAL SYSTEM

REQUIREMENTS OF CONSULTANTS

REGIONAL CONSIDERATIONS

ENERGY CONSERVATION

INTERRELATIONSHIP OF DRAWINGS

PROJECT MANAGEMENT

OFFICE PROCEDURE AND PLANNING STRATEGY

TRACKING A SET OF WORKING DRAWINGS

FORMAT/CARTOON

PROJECT BOOK

NUMBERS—LEGAL, JOB, TASK

DRAWING SEQUENCE

DELIVERY METHODS

PART II: Document Evolution

Chapter 7: SITE AND GRADING PLAN

SITE ANALYSIS

SITE ANALYSIS APPLIED

THE TOPOGRAPHY MAP

THE SOILS AND GEOLOGY MAP

THE SITE PLAN

THE GRADING PLAN

THE SITE AND GRADING PLAN

THE DRAINAGE PLAN

THE EROSION AND SEDIMENT CONTROL PLANS

THE UTILITY PLAN

THE CIRCULATION PLAN

THE LANDSCAPE, IRRIGATION, AND DRAINAGE PLANS

THE SITE IMPROVEMENT PLAN: AN OVERVIEW

SIZE AND LOCATION

Chapter 8: FLOOR PLAN

TYPES OF FLOOR PLANS

SYMBOLS

OTHER FLOOR-PLAN CONSIDERATIONS

DRAWING A FLOOR PLAN WITH A COMPUTER

Chapter 9: FOUNDATION AND ROOF PLANS, FLOOR AND ROOF FRAMING SYSTEMS

FOUNDATION INTRODUCTION

TYPES OF FOUNDATIONS

EXAMPLES

SUMMARY OF TYPICAL CONVENTIONS FOR FOUNDATION PLAN

EXTERIOR AND INTERIOR WALLS

A STEEL STRUCTURE

ROOF PLANS AND FRAMING SYSTEMS

FRAMING WITH DIFFERENT MATERIALS

FLOOR FRAMING

Chapter 10: BUILDING SECTIONS

BUILDING SECTIONS DEFINED

Drawing a Building Section

TYPES OF BUILDING SECTIONS

DRAFTING A BUILDING SECTION

DRAFTING A BUILDING SECTION OF A RESIDENCE

Chapter 11: EXTERIOR AND INTERIOR ELEVATIONS

INTRODUCTION TO EXTERIOR ELEVATIONS

DRAWING DOORS AND WINDOWS

MATERIAL DESIGNATIONS

NOTES

DOTTED LINES

CONTROLLING FACTORS

DRAFTING AN EXTERIOR ELEVATION

WEATHERPROOFING

DRAWING AN ELEVATION WITH AND WITHOUT A MODEL

EXTERIOR ELEVATION USING BIM/REVIT

INTERIOR ELEVATIONS

DIMENSIONS AND INTERSECTIONS

DRAFTING AN INTERIOR ELEVATION: EXAMPLES

COMPUTERS AND INTERIOR ELEVATIONS

EVOLUTION OF A SET OF INTERIOR ELEVATIONS

INTERIOR ELEVATIONS USING BIM/REVIT

Chapter 12: SCHEDULES: DOOR, WINDOW, AND FINISH

SCHEDULES DEFINED

TABULATED SCHEDULES: DOORS AND WINDOWS

PICTORIAL SCHEDULES: DOORS AND WINDOWS

CHOOSING A TABULATED OR PICTORIAL SCHEDULE

INTERIOR FINISH SCHEDULES

ADDITIONAL SCHEDULES

SCHEDULES AS THEY RELATE TO STRUCTURAL ENTITIES

CAD-GENERATED AND COMPUTER-DRAFTED SCHEDULES

SCHEDULE TEMPLATES

SCHEDULES USING BIM OR REVIT

Chapter 13: ARCHITECTURAL DETAILS AND VERTICAL LINKS (STAIRS/ELEVATORS)

THE PURPOSE OF ARCHITECTURAL DETAILS

FREEHAND DETAIL SKETCHES

USING DETAILS IN CONSTRUCTION DOCUMENTS

HARD-LINE (HAND-DRAFTED AND CAD)

FOOTING DETAIL

WINDOW DETAIL

FIREPLACE

STAIR DESIGN AND VERTICAL LINKS

MECHANICAL VERTICAL LINKS

DETAILING IN BIM/REVIT

TENANT IMPROVEMENT DETAILS

PART III: Case Studies

Chapter 14: CONSTRUCTION DOCUMENTS FOR A ONE-STORY, CONVENTIONAL WOOD-FRAMED RESIDENCE

CONCEPTUAL DESIGN

DESIGN AND SCHEMATIC DRAWINGS

EVOLUTION OF THE WORKING DRAWINGS

SITE PLAN, VICINITY MAP, ROOF PLAN, AND NOTES

JADYN RESIDENCE SITE PLAN

JADYN RESIDENCE FLOOR PLAN

JADYN RESIDENCE ROOF PLAN

JADYN RESIDENCE BUILDING SECTIONS

JADYN RESIDENCE EXTERIOR ELEVATIONS

JADYN RESIDENCE FOUNDATION PLAN

FRAMING A RESIDENCE

JADYN RESIDENCE ROOF FRAMING PLAN

JADYN RESIDENCE INTERIOR ELEVATIONS

SET CHECK

Chapter 15: CONSTRUCTION DOCUMENTS FOR A TWO-STORY, WOOD-FRAMED RESIDENCE WITH BASEMENT

SCHEMATIC DESIGN FOR BLU RESIDENCE

SITE PLAN

FIRST-FLOOR PLAN

SECOND-FLOOR PLAN

ROOF PLAN

BLU RESIDENCE BUILDING SECTIONS

BLU RESIDENCE BUILDING ELEVATIONS

FOUNDATION PLAN: SLAB AND RAISED WOOD

BLU RESIDENCE FOUNDATION PLAN: RAISED WOOD

FRAMING PLAN

SUPPORT DRAWINGS FOR BLU RESIDENCE

Chapter 16: CONCEPTUAL DESIGN AND CONSTRUCTION DOCUMENTS FOR A STEEL AND MASONRY BUILDING (THEATER)

INTRODUCTION

CONCEPTUAL DESIGN: Site and Client Requirements

Design Development Punch List

INITIAL SCHEMATIC STUDIES

SITE PLAN

FOUNDATION PLAN

GROUND-FLOOR PLAN

PARTIAL FLOOR PLAN AND INTERIOR ELEVATIONS

EXTERIOR ELEVATIONS

BUILDING SECTIONS

ROOF PLAN

ROOF FRAMING PLAN

Chapter 17: MADISON STEEL BUILDING

INTRODUCTION

THE MADISON OFFICE BUILDING

FLOOR-PLAN DESIGN DEVELOPMENT PHASE

SUMMARY

Chapter 18: TENANT IMPROVEMENTS

TENANT IMPROVEMENT INTRODUCTION

EXISTING BUILDINGS

EXISTING FLOOR LEVEL— BUILDING A

DEVELOPMENT OF WORKING DRAWINGS—BUILDING B

WORKING DRAWINGS

INDEX

End User License Agreement

Pages

iii

iv

xiii

xiv

1

3

4

5

6

7

8

9

11

10

12

13

14

15

17

18

19

20

21

22

23

24

25

26

27

28

29

30

31

32

33

34

35

36

37

38

39

40

41

42

43

44

45

46

47

48

49

50

51

52

53

54

55

56

57

58

59

60

61

62

63

64

65

66

67

68

69

70

71

72

73

74

75

76

77

78

79

80

81

82

83

84

85

86

87

88

89

90

91

92

93

94

95

96

97

98

99

100

101

102

103

104

105

106

107

108

109

110

111

112

113

114

115

116

117

118

119

120

121

122

123

124

125

126

127

128

129

130

131

132

133

135

136

137

138

140

139

141

142

143

144

145

146

147

148

149

150

151

152

153

154

155

156

157

158

159

160

161

162

163

164

165

166

167

168

169

170

171

172

173

174

175

176

177

178

179

180

181

182

183

184

185

186

187

188

189

190

191

192

193

194

195

196

197

198

199

200

201

202

203

204

205

206

207

208

209

210

211

212

213

214

215

217

219

220

221

222

223

224

225

226

227

228

229

230

231

232

233

234

235

236

237

238

239

240

241

242

243

244

245

246

247

248

249

250

251

252

253

254

255

256

257

258

259

260

261

262

263

264

265

266

267

268

269

270

271

272

273

274

275

276

277

278

279

280

281

282

283

284

285

287

288

289

290

291

292

293

294

295

296

297

298

299

300

301

302

303

304

305

306

307

308

309

310

311

312

313

314

315

316

317

318

319

320

321

322

323

324

325

326

327

328

329

330

331

332

333

334

335

336

337

338

339

340

341

343

345

342

346

344

347

348

349

350

351

352

353

354

355

356

357

358

359

360

361

362

363

365

366

367

369

370

371

372

373

368

374

375

376

377

378

379

381

380

382

383

384

385

386

387

388

389

390

391

392

393

394

395

396

397

398

399

400

401

402

403

404

405

406

407

408

409

410

411

412

413

414

415

416

417

418

419

421

422

423

424

425

426

427

428

429

430

431

432

433

434

435

436

437

438

439

440

441

442

443

444

445

446

447

448

449

450

451

452

453

454

455

456

457

458

459

461

462

463

464

465

466

467

468

469

470

471

472

473

474

475

476

477

478

479

480

481

482

483

484

485

486

487

488

490

491

492

489

494

493

495

496

497

498

499

500

501

502

503

504

505

507

508

509

510

511

512

513

514

515

516

517

518

519

520

521

522

523

524

525

527

528

529

530

531

526

532

533

534

535

536

537

538

540

539

542

543

544

541

545

546

547

548

549

550

551

552

553

554

555

556

557

558

559

560

561

562

563

564

565

566

567

568

569

570

571

572

573

574

575

576

577

578

579

580

581

582

583

584

585

586

587

588

589

590

591

592

593

594

595

597

598

599

600

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!

Lesen Sie weiter in der vollständigen Ausgabe!